  ▄▄▄▄▄▄▄▄▄▄▄▄▄▄
  DISABLE ESCAPE
  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀

  If this option is set to 'Y'es, all simulations
  CANNOT be aborted with the 'ESC' key. This increases
  simulation speed by approximately 8 percent.
